Figure 1: Poloidal Mesh with 1/4 of meshpoints.

Figure 2: Equilibrium ψ.

Figure 3: Equilibrium q profile.

(a) (b) Figure 4: (a) density at ϕ = 0, t = 0, (b) t = 96.

Figure 5: (a) Averaged density at (a) t = 0, (b) t = 30, (c) t = 96.

(a) (b) Figure 6: (a) density isoplot at t = 0, (b) t = 51.

(a) (b) Figure 7: (a) density isoplot at t = 79, (b) t = 96.

(a) (b) Figure 8: Density in poloidal plane at (a) t = 0, (b) t = 12.7

Figure 9: Density in poloidal plane at t = 65.

Figure 10: Averaged density at (a) t = 0, (b) t = 65.

(a) (b) Figure 11: (a) density isoplot at t = 12.7, (b) t = 65.

Figure 12: Poloidal flux ψ at ζ = 0 and t = 12.7.

Figure 13: Averaged q profile at t = 12.7.

(a) (b) Figure 14: Density in poloidal plane at (a) t = 0, (b) t = 150.

Figure 15: Averaged density at (a) t = 0, (b) t = 150.

Figure 16: δψ/ψ as a function of δp/p cos(θ).